, aux. units

beam p 20 22 24 26 28 30 32

, aux. units

ECAL E

4200

4400

4600

4800

5000

5200

5400

E resolution: 5 GeV

, aux. units

beam p 20 22 24 26 28 30 32

, aux. units

ECAL E

8500

9000

9500

10000

10500

11000

E resolution: 10 GeV

, aux. units

beam p 20 22 24 26 28 30 32

, aux. units

ECAL E

16000

16500

17000

17500

18000

18500

19000

19500

20000

20500

E resolution: 19 GeV